\chapter{Distribuciones}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% Distribuciones mejor diseñadas para servidores %
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\input{Distribuciones/Servidores}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% Distribuciones mejor diseñadas para estaciones de trabajo %
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\input{Distribuciones/EstacionesDeTrabajo}

%%%%%%%%%%%%%%%%%%%%%%%
% Diferencias básicas %
%%%%%%%%%%%%%%%%%%%%%%%
\input{Distribuciones/Comparativas}
